\section{lib/pack/ptest.c File Reference}
\label{ptest_8c}\index{lib/pack/ptest.\-c@{lib/pack/ptest.\-c}}
{\ttfamily \#include $<$assert.\-h$>$}\\*
{\ttfamily \#include \char`\"{}render.\-h\char`\"{}}\\*
{\ttfamily \#include \char`\"{}neatoprocs.\-h\char`\"{}}\\*
{\ttfamily \#include \char`\"{}pack.\-h\char`\"{}}\\*
Include dependency graph for ptest.\-c\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{ptest_8c__incl}
\end{center}
\end{figure}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
{\bf main} ({\bf int} argc, char $\ast$argv[$\,$])
\end{DoxyCompactItemize}
\subsection*{Variables}
\begin{DoxyCompactItemize}
\item 
char $\ast$ {\bf Info} [$\,$]
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\index{ptest.\-c@{ptest.\-c}!main@{main}}
\index{main@{main}!ptest.c@{ptest.\-c}}
\subsubsection[{main}]{\setlength{\rightskip}{0pt plus 5cm}main (
\begin{DoxyParamCaption}
\item[{{\bf int}}]{argc, }
\item[{char $\ast$}]{argv[$\,$]}
\end{DoxyParamCaption}
)}\label{ptest_8c_ae0665038b72011f5c680c660fcb59459}


Definition at line 289 of file ptest.\-c.



References agdelete(), agedge(), agedgeattr, agfindnode, agfstnode(), agfstout(), agnedges(), agnnodes(), agnode(), agnxtnode(), agnxtout(), agopen(), agread(), agwrite(), attach\-\_\-attrs(), ccomps(), E\-D\-\_\-spl, Files, graph\-\_\-init(), G\-V\-S\-P\-L\-I\-N\-E\-S, is\-Connected(), N\-\_\-\-G\-N\-E\-W, N\-D\-\_\-pos, pack\-Graphs(), P\-O\-I\-N\-T\-S\-\_\-\-P\-E\-R\-\_\-\-I\-N\-C\-H, P\-Sinputscale, and State.



\subsection{Variable Documentation}
\index{ptest.\-c@{ptest.\-c}!Info@{Info}}
\index{Info@{Info}!ptest.c@{ptest.\-c}}
\subsubsection[{Info}]{\setlength{\rightskip}{0pt plus 5cm}char$\ast$ Info[$\,$]}\label{ptest_8c_a1a936d074bad2a7f521d3aec2732ee41}
{\bfseries Initial value\-:}
\begin{DoxyCode}
= \{
    \textcolor{stringliteral}{"ptest"},                    
    \textcolor{stringliteral}{"1.0"},                      
    DATE                        
\}
\end{DoxyCode}


Definition at line 34 of file ptest.\-c.

