\section{lib/neatogen/printvis.c File Reference}
\label{printvis_8c}\index{lib/neatogen/printvis.\-c@{lib/neatogen/printvis.\-c}}
{\ttfamily \#include $<$stdio.\-h$>$}\\*
{\ttfamily \#include $<$vis.\-h$>$}\\*
Include dependency graph for printvis.\-c\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{printvis_8c__incl}
\end{center}
\end{figure}
\subsection*{Typedefs}
\begin{DoxyCompactItemize}
\item 
typedef {\bf Ppoint\-\_\-t} {\bf point}
\end{DoxyCompactItemize}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
void {\bf printvis} ({\bf vconfig\-\_\-t} $\ast$cp)
\end{DoxyCompactItemize}


\subsection{Typedef Documentation}
\index{printvis.\-c@{printvis.\-c}!point@{point}}
\index{point@{point}!printvis.c@{printvis.\-c}}
\subsubsection[{point}]{\setlength{\rightskip}{0pt plus 5cm}typedef {\bf Ppoint\-\_\-t} {\bf point}}\label{printvis_8c_ae1f0b111a0d6db5f79c232427ba86411}


Definition at line 16 of file printvis.\-c.



\subsection{Function Documentation}
\index{printvis.\-c@{printvis.\-c}!printvis@{printvis}}
\index{printvis@{printvis}!printvis.c@{printvis.\-c}}
\subsubsection[{printvis}]{\setlength{\rightskip}{0pt plus 5cm}void printvis (
\begin{DoxyParamCaption}
\item[{{\bf vconfig\-\_\-t} $\ast$}]{cp}
\end{DoxyParamCaption}
)}\label{printvis_8c_afd8758e4dd9d2a8489972ff7dd5a857c}


Definition at line 19 of file printvis.\-c.



References vconfig\-\_\-s\-::\-N, vconfig\-\_\-s\-::next, vconfig\-\_\-s\-::\-P, vconfig\-\_\-s\-::prev, and vconfig\-\_\-s\-::vis.

