\section{plugin/gtk/gvdevice\-\_\-gtk.c File Reference}
\label{gvdevice__gtk_8c}\index{plugin/gtk/gvdevice\-\_\-gtk.\-c@{plugin/gtk/gvdevice\-\_\-gtk.\-c}}
{\ttfamily \#include \char`\"{}config.\-h\char`\"{}}\\*
{\ttfamily \#include $<$stdint.\-h$>$}\\*
{\ttfamily \#include \char`\"{}gvplugin\-\_\-device.\-h\char`\"{}}\\*
Include dependency graph for gvdevice\-\_\-gtk.\-c\-:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{gvdevice__gtk_8c__incl}
\end{center}
\end{figure}
\subsection*{Variables}
\begin{DoxyCompactItemize}
\item 
{\bf gvplugin\-\_\-installed\-\_\-t} {\bf gvdevice\-\_\-types\-\_\-gtk} [$\,$]
\end{DoxyCompactItemize}


\subsection{Variable Documentation}
\index{gvdevice\-\_\-gtk.\-c@{gvdevice\-\_\-gtk.\-c}!gvdevice\-\_\-types\-\_\-gtk@{gvdevice\-\_\-types\-\_\-gtk}}
\index{gvdevice\-\_\-types\-\_\-gtk@{gvdevice\-\_\-types\-\_\-gtk}!gvdevice_gtk.c@{gvdevice\-\_\-gtk.\-c}}
\subsubsection[{gvdevice\-\_\-types\-\_\-gtk}]{\setlength{\rightskip}{0pt plus 5cm}{\bf gvplugin\-\_\-installed\-\_\-t} gvdevice\-\_\-types\-\_\-gtk[$\,$]}\label{gvdevice__gtk_8c_a70aa947af1221901096ee30844b2aa6e}
{\bfseries Initial value\-:}
\begin{DoxyCode}
= \{





    \{0, NULL, 0, NULL, NULL\}
\}
\end{DoxyCode}


Definition at line 158 of file gvdevice\-\_\-gtk.\-c.

